X-Git-Url: https://pere.pagekite.me/gitweb/text-smell-og-bang-hauge.git/blobdiff_plain/a5917b21c1fb9f2d048de42deeb1ca5ead2c85d7..8e8d4c6202b3e69a9c84bdc7495dad1ee938c8ee:/SLChapter-Appendix.tex

diff --git a/SLChapter-Appendix.tex b/SLChapter-Appendix.tex
index ce0d3c8..b38cd88 100644
--- a/SLChapter-Appendix.tex
+++ b/SLChapter-Appendix.tex
@@ -1,2 +1,2 @@
-\chapter{Appendix}
+\chapter{Appendix}
 \newpage 
\ No newline at end of file
