\begin{thebibliography}{10}

\bibitem{Joseph}
E.~Morholt H.~Pollack A.~Joseph, P.F.~Brandwein and J.~F. Castka.
\newblock {\em A Sourcebook for the Phusical Sciences}.
\newblock Number p. 258. Harcourt, Brace and World: New York, 1961.

\bibitem{vogel}
B.S. Furnis A.J. Hannaford P.W.G.~Smith A.I.~Vogel, A.R.~Tatchell.
\newblock {\em Vogel's Textbook of Practical Organic Chemistry}.
\newblock Prentice Hall, 5 edition, February 9 1996.
\newblock 1552 pages.

\bibitem{alyeahornbeck}
H.~N. Alyea and L.~G. Hornbeck.
\newblock {\em Journal of Chemical Education}, A84(44), 1967.

\bibitem{sommerlin}
C~Borgford and L~Sommerlin.
\newblock Chemical activities.
\newblock {\em American Chemical Society}, (p 89), 1988.

\bibitem{Vincent}
M.~Lazzari C.~A.~Vincent, F.~Bronino and B.~Scrosati.
\newblock {\em Modern Batteries: An Introduction to Electrochemical Power
  Sources}.
\newblock Edward Arnold: London, 1984.

\bibitem{Chen}
P.~Chen.
\newblock {\em Entertaining and Educational Chemical Demonstrations}.
\newblock Chemical Elements: Camarillo, CA, 1976.

\bibitem{Cotton}
G.~Cotton, F. A.;~Wilkinson.
\newblock {\em Advanced Inorganic Chemistry: A Comprehensive Text}.
\newblock Interscience Publishers, John Wiley and Sons, 6 edition, New York,
  1966.

\bibitem{Cotton2}
G.~Cotton, F. A.;~Wilkinson.
\newblock {\em Advanced Inorganic Chemistry}.
\newblock John Wiley and Sons, New York, 3d edition, New York, 1972.

\bibitem{Anderson}
I.C.M.~Dea D.M.W.~Anderson and Sel A.~Hendrie.
\newblock {\em Ann. Rev. Anal. Sci.}, (1, 1), 1971.

\bibitem{Dunbar}
R.~E. Dunbar.
\newblock {\em Journal of Chemical Educ.}, 25:A299, 1958.

\bibitem{dutton2}
Alyea H.~N. Dutton.
\newblock {\em Tested Demonstrations in Chemistry}.
\newblock Journal of Chemical Education: Easton, Pennsylvania, 6 edition, 1965.

\bibitem{dutton}
Alyea H.~N. Dutton.
\newblock {\em TOPS in General Chemistry}.
\newblock Journal of Chemical Education: Easton, Pennsylvania, 3 edition, 1967.

\bibitem{Casassa}
A.~M.~Sarquis E.~Z.~Casassa and C.~H.~Van Dyke.
\newblock The gelation of polyvinyl alcohol with borax: A novel class
  participation experiment involving the preparation and properties of a
  "slime".
\newblock {\em Journal of Chemical Education}, 63:57, 1986.

\bibitem{muir}
G.~D.~Muir (ed.).
\newblock Hazards in the chemical laboratory.
\newblock {\em The Chemical Society, London}, page 199, 1997.

\bibitem{el-awady}
L.~J. El-Awady, A.;~Prell.
\newblock Chemical demonstrations proceedings.
\newblock {\em Western Illinois University and Quincy-Keokuk Section of the
  American Chemical Society}, 1979.

\bibitem{Ellern}
H.~Ellern.
\newblock {\em $"$Modern Pyrotechnics$"$}.
\newblock Chemical Publishing Co., Inc. New York, 1961.

\bibitem{plazanet}
Plazanet~M et~al.
\newblock Freezing on heating of liquid.
\newblock {\em Journal of Chemical Physics}, 121(5031-5034 doi:
  10.1063/1.1794652), 2004.

\bibitem{Faraday3}
Michael Faraday.
\newblock {\em The chemical history of a candle: a course of six lectures
  delivered before a juvenile auditory at the Royal Institution of Great
  Britain during the Christmas Holidays of 1860-1}.
\newblock Courier Dover Publications, 2002.

\bibitem{fowles}
G.~Fowles.
\newblock {\em Lecture Demonstrations in Chemistry}.
\newblock Number 175-180. G. Bell $\&$ Sons Ltd, London, 1947.

\bibitem{meth.nitro}
Ripudaman Malhotra $\&$ Subhash C.~Narang George A.~Olah.
\newblock {\em NITRATION - Methods and Mechanisms}.
\newblock VCH Publishers, Inc., 1 edition, 1989.
\newblock 330 pages \\ ISBN: 0-89573-144-4.

\bibitem{vogel2}
J.~Mendham G.H.~Jeffery, J.~Bassett and R.C. Denney.
\newblock {\em Vogel`s Textbook of Quantitative Chemical Analysis}.
\newblock Longman Scientific $\&$ Technical, fifth edition, 1991.

\bibitem{Gimblett}
F.G.R. Gimblett.
\newblock {\em Introduction to the Kinetics of Chemical Chain Reactions}.
\newblock Number 13-19. McGrawHill: London, 1970.

\bibitem{Gilbert}
Ed. G.L.~Gilbert.
\newblock Tested demonstrations in chemistry and selected demonstrations.
\newblock {\em Journal of Chemical Education}, 1:1--35, 1994.
\newblock Denison University, Granville.

\bibitem{henisch}
H.~K. Henisch.
\newblock {\em Crystal Growth in Gels}.
\newblock Pennsylvania State University Press: University Park, Pennsylvania,
  1970.

\bibitem{Hugo}
Aksel Hugo.
\newblock Når faget vokser ut av fenomene. naturen som historieforteller.
\newblock {\em Program for pedagoikk. Norges landbrukshøgskole}, page~26, 2002.

\bibitem{artaki}
T.~W.~Zerda I.~Artaki, M.~Bradley and J.~Jones.
\newblock {\em Journal of Phys. Chem.}, 89:4399, 1985.

\bibitem{Iler}
R.~K. Iler.
\newblock The colloid chemistry of silica and silicates.
\newblock {\em Cornell University Press: Ithaca, New York}, 1955.

\bibitem{dean}
J.A.Dean.
\newblock {\em Lange`s Handbook of Chemistry}.
\newblock McGraw-Hill Book Co. New York, 13th edition, 1985.

\bibitem{Kauffman}
G.~B. Kaufman and C.~A. Ferguson.
\newblock Colorful stalagmites: The silicate garden.
\newblock {\em J. College Sci. Teach.}, (491), 1986.

\bibitem{Keeney}
Christina; Cornelius Richard~D. Keeney, Allen;~Walters.
\newblock Making sparklers: An introductory laboratory experiment.
\newblock {\em Journal of Chemical Education}, 72(7):652, July 1995.

\bibitem{Kirkland}
J.J. Kirkland and L.R. Snyder.
\newblock {\em Introduction to Modern Liquid Chromatofraphy}.
\newblock John Wiley, New York, 1979.

\bibitem{all}
Per Kofstad.
\newblock {\em Uorganisk Kjemi - en innføring i grunnstoffenes kjemi}.
\newblock Tano forlag a/s, 3 edition, Februar 1992.
\newblock 510 pages \\ ISBN: 82-518-3042-7.

\bibitem{Kozawa}
A.~Kozawa and R.~A. Powers.
\newblock Electrochemical reactions in batteries: Emphasizing the mno$_{2}$
  cathode of dry cells.
\newblock {\em Journal of Chemical Education}, 49, 9:587-591, Sept. 1972.

\bibitem{Lancaster}
R.~Lancaster.
\newblock {\em $"$Fireworks, Principles and Practice$"$}.
\newblock Chemical publishing Co., Inc. New York, 1972.

\bibitem{crc}
Ed. Liede, David.~R.
\newblock {\em CRC Handbook of Chemistry and Physics}.
\newblock Number 5-23, 5-51. CRC Press, INC., 72nd edition, February 20 1991.

\bibitem{Linden}
D.~Linden, editor.
\newblock {\em Handbook of Batteries and Fuel Cells}.
\newblock McGraw-Hill Book Co., New York (1984).

\bibitem{linke}
W.~F. Linke.
\newblock {\em Solubilities of Inorganic and Metal Organic Compounds}, volume
  II, pp 708-9.
\newblock American Chemical Society; Washington, D. C., 1985.

\bibitem{Majors}
R.E. Majors.
\newblock {\em Am. Lab.,}, (7, 13), 1976.

\bibitem{Mellor}
J.~W. Mellor.
\newblock {\em A Comprehensive Treatise on Inorganic and Theoretical
  Chemistry}, volume~2.
\newblock Longmans, Green and Co.: London, 1922.

\bibitem{muir2}
Ed. Muir, G.~D.
\newblock {\em Hazards in the Chemical Laboratory}.
\newblock The Chemical Society: London, 3 edition, 1981.

\bibitem{mullin}
V.~L. Mullin.
\newblock {\em Chemistry Experiments for Children}.
\newblock Dover: New York, 1968.

\bibitem{ras98.1}
Henry Feuer $\&$ Arnold~T. Nielsen.
\newblock Recent advances in synthesis and chemistry (organic nitro chemistry).
\newblock In Henry Feuer $\&$ Arnold~T. Nielsen, editor, {\em Nitro Compounds},
  1990.
\newblock ISBN: 0471187143 - 636 pages; John Wiley $\&$ Sons (February 13,
  1990).

\bibitem{odian}
G.~Odian.
\newblock {\em Principles of Polymerization}.
\newblock Wiley-Interscience: New York, third edition, 1981.

\bibitem{nitro}
Noboru Ono.
\newblock {\em The Nitro Group in Organic Synthesis}.
\newblock Wiley-VCH, 1 edition, March 15 2001.
\newblock 392 pages \\ ISBN: 0-471-31611-3.

\bibitem{part}
Saul Patai.
\newblock {\em Part 2, The Chemistry of Amino, Nitroso, Nitro and Related
  Groups, Supplement F2}.
\newblock John Wiley $\&$ Sons, 1 edition, December 3 1996.
\newblock 756 pages \\ ISBN: 0-471-95171-4.

\bibitem{Perkins}
R.I. Perkins.
\newblock {\em Journal of Chemical Education}, 63:781, 1986.

\bibitem{Pritchard}
J.~G. Pritchard.
\newblock {\em Poly(vinylalcohol): Basic Properties and Uses}.
\newblock Gordon and Breach: New York, 1970.

\bibitem{org.nitro}
Sergio Cenini $\&$~Fabio Ragaini.
\newblock {\em Catalytic Reductive Carbonylation of Organic Nitro Compounds
  (Catalysis By Metal Complexes)}, volume~20.
\newblock Kluwer Academic Publishers, 1 edition, January 1 1997.
\newblock 339 pages \\ ISBN: 0-792-34307-7.

\bibitem{Ravve}
A~Ravve.
\newblock {\em Organic Chemistry of Macromolecules}.
\newblock Marcel Dekker, New York, 1967.
\newblock Ch. 15.

\bibitem{renfrew}
Ed. Renfrew, M.~M.
\newblock Safety in the chemical laboratory.
\newblock {\em Journal of Chemical Education: Easton, Pennsylvania}, 4, 1981.

\bibitem{jynge}
Knut Jynge $\&$~Bjørn Riise.
\newblock Funny reactions.
\newblock Chemistry reports, University Of Tromsø; Institute Of Mathematical
  and Physical Sciences, July 1994.

\bibitem{sax}
N.~I. Sax.
\newblock {\em Dangerous Properties of Industrial Materials}.
\newblock Reinhold Book Corp. New York, 3 edition, 1968; p 1003.

\bibitem{sellinger}
Ben Sellinger.
\newblock {\em Chemistry in the marketplace. A Consumer Guide}.
\newblock Harcourt Brace $\&$ Company, Australia, 1989.

\bibitem{Seymour2}
Raymond~B. Seymour and Charles~E. Carraher.
\newblock {\em GIANT MOLECULES; Essential Materials for Everyday Living and
  Problem Solving}.
\newblock Wiley-Interscience: New York, 1 edition, 1990.

\bibitem{bassam1}
Bassam~Z. Shakhashiri.
\newblock {\em Chemical Demonstrations - A Handbook for Teachers of Chemistry},
  volume~1.
\newblock The University of Winsconsin Press, 1 edition, 1983.
\newblock 343 pages \\ ISBN: 0-299-08890-1.

\bibitem{bassam2}
Bassam~Z. Shakhashiri.
\newblock {\em Chemical Demonstrations - A Handbook for Teachers of Chemistry},
  volume~2.
\newblock The University of Winsconsin Press, 1 edition, 1985.
\newblock 312 pages \\ ISBN: 0-299-10130-4.

\bibitem{bassam3}
Bassam~Z. Shakhashiri.
\newblock {\em Chemical Demonstrations - A Handbook for Teachers of Chemistry},
  volume~3.
\newblock The University of Winsconsin Press, 1 edition, 1989.
\newblock 401 pages \\ ISBN: 0-299-11950-5.

\bibitem{bassam4}
Bassam~Z. Shakhashiri.
\newblock {\em Chemical Demonstrations - A Handbook for Teachers of Chemistry},
  volume~4.
\newblock The University of Winsconsin Press, 1 edition, 1992.
\newblock 290 pages \\ ISBN: 0-299-12860-1.

\bibitem{Shimizu}
T.~Shimizu.
\newblock {\em $"$Fireworks: The Art, Science and Technique$"$}.
\newblock Pyrotechnica Publications, Austin, Texas, USA, 1981.

\bibitem{Simpson}
C.F. Simpson, editor.
\newblock {\em Techniques in Liquid Chromatography}.
\newblock John Wiley, New York, 1982.

\bibitem{Sorenson}
T.W. Sorenson, W.R.;~Campell.
\newblock {\em Preparative Methods of Polymer Chemistry}.
\newblock Interscience Publishers, John Wiley and Sons, New York, 1968, pp
  90-93.

\bibitem{suib}
S.~L. Suib.
\newblock {\em Journal of Chemical education}, 62:81, 1985.

\bibitem{thomson}
Stephen Thompson.
\newblock {\em Chemtrek - small-scale experiments for general chemistry}.
\newblock Prentice-Hall, Inc, Englewood Cliffs, New Jersey 07632, 1 edition,
  1989.

\bibitem{vivian}
C.~Vivian.
\newblock {\em Science Experiments and Amusements for Children}.
\newblock Dover: New York, 1967.

\bibitem{Volkovich}
V.A. Volkovich and T.R. Griffiths.
\newblock Catalytic oxidation of ammonia: A sparkling experiment.
\newblock {\em Journal of Chemical Education}, 77(177), 2000.

\bibitem{Wetting}
Olav Wetting.
\newblock {\em Norsk fyrstikkindustri før år 1900}.
\newblock Universitetsforlaget, Oslo 1968.

\bibitem{trop}
Steven~S. Zumdahl.
\newblock {\em Chemical Principles}.
\newblock D. C. Heath and Company, 2 edition, March 1995.
\newblock 1343 pages \\ ISBN: 0-669-39321-5.

\end{thebibliography}