\begin{thebibliography}{10}

\bibitem{vogel}
B.S. Furnis A.J. Hannaford P.W.G.~Smith A.I.~Vogel, A.R.~Tatchell.
\newblock {\em Vogel's Textbook of Practical Organic Chemistry}.
\newblock Prentice Hall, 5 edition, February 9 1996.
\newblock 1552 pages.

\bibitem{Chen}
P.~Chen.
\newblock {\em Entertaining and Educational Chemical Demonstrations}.
\newblock Chemical Elements: Camarillo, CA, 1976.

\bibitem{Cotton}
G.~Cotton, F. A.;~Wilkinson.
\newblock {\em Advanced Inorganic Chemistry: A Comprehensive Text}.
\newblock Interscience Publishers, John Wiley and Sons, 6 edition, New York,
  1966.

\bibitem{Anderson}
I.C.M.~Dea D.M.W.~Anderson and Sel A.~Hendrie.
\newblock {\em Ann. Rev. Anal. Sci.}, (1, 1), 1971.

\bibitem{dutton}
Alyea H.~N. Dutton.
\newblock {\em TOPS in General Chemistry}.
\newblock Journal of Chemical Education: Easton, Pennsylvania, 3 edition, 1967.

\bibitem{el-awady}
L.~J. El-Awady, A.;~Prell.
\newblock Chemical demonstrations proceedings.
\newblock {\em Western Illinois University and Quincy-Keokuk Section of the
  American Chemical Society}, 1979.

\bibitem{plazanet}
Plazanet~M et~al.
\newblock Freezing on heating of liquid.
\newblock {\em Journal of Chemical Physics}, 121(5031-5034 doi:
  10.1063/1.1794652), 2004.

\bibitem{meth.nitro}
Ripudaman Malhotra $\&$ Subhash C.~Narang George A.~Olah.
\newblock {\em NITRATION - Methods and Mechanisms}.
\newblock VCH Publishers, Inc., 1 edition, 1989.
\newblock 330 pages \\ ISBN: 0-89573-144-4.

\bibitem{vogel2}
J.~Mendham G.H.~Jeffery, J.~Bassett and R.C. Denney.
\newblock {\em Vogel`s Textbook of Quantitative Chemical Analysis}.
\newblock Longman Scientific $\&$ Technical, fifth edition, 1991.

\bibitem{dean}
J.A.Dean.
\newblock {\em Lange`s Handbook of Chemistry}.
\newblock McGraw-Hill Book Co. New York, 13th edition, 1985.

\bibitem{Kauffman}
G.~B. Kaufman and C.~A. Ferguson.
\newblock Colorful stalagmites: The silicate garden.
\newblock {\em J. College Sci. Teach.}, (491), 1986.

\bibitem{Kirkland}
J.J. Kirkland and L.R. Snyder.
\newblock {\em Introduction to Modern Liquid Chromatofraphy}.
\newblock John Wiley, New York, 1979.

\bibitem{all}
Per Kofstad.
\newblock {\em Uorganisk Kjemi - en innføring i grunnstoffenes kjemi}.
\newblock Tano forlag a/s, 3 edition, Februar 1992.
\newblock 510 pages \\ ISBN: 82-518-3042-7.

\bibitem{linke}
W.~F. Linke.
\newblock {\em Solubilities of Inorganic and Metal Organic Compounds}, volume
  II, pp 708-9.
\newblock American Chemical Society; Washington, D. C., 1985.

\bibitem{Majors}
R.E. Majors.
\newblock {\em Am. Lab.,}, (7, 13), 1976.

\bibitem{mullin}
V.~L. Mullin.
\newblock {\em Chemistry Experiments for Children}.
\newblock Dover: New York, 1968.

\bibitem{ras98.1}
Henry Feuer $\&$ Arnold~T. Nielsen.
\newblock Recent advances in synthesis and chemistry (organic nitro chemistry).
\newblock In Henry Feuer $\&$ Arnold~T. Nielsen, editor, {\em Nitro Compounds},
  1990.
\newblock ISBN: 0471187143 - 636 pages; John Wiley $\&$ Sons (February 13,
  1990).

\bibitem{nitro}
Noboru Ono.
\newblock {\em The Nitro Group in Organic Synthesis}.
\newblock Wiley-VCH, 1 edition, March 15 2001.
\newblock 392 pages \\ ISBN: 0-471-31611-3.

\bibitem{part}
Saul Patai.
\newblock {\em Part 2, The Chemistry of Amino, Nitroso, Nitro and Related
  Groups, Supplement F2}.
\newblock John Wiley $\&$ Sons, 1 edition, December 3 1996.
\newblock 756 pages \\ ISBN: 0-471-95171-4.

\bibitem{org.nitro}
Sergio Cenini $\&$~Fabio Ragaini.
\newblock {\em Catalytic Reductive Carbonylation of Organic Nitro Compounds
  (Catalysis By Metal Complexes)}, volume~20.
\newblock Kluwer Academic Publishers, 1 edition, January 1 1997.
\newblock 339 pages \\ ISBN: 0-792-34307-7.

\bibitem{renfrew}
Ed. Renfrew, M.~M.
\newblock Safety in the chemical laboratory.
\newblock {\em Journal of Chemical Education: Easton, Pennsylvania}, 4, 1981.

\bibitem{sax}
N.~I. Sax.
\newblock {\em Dangerous Properties of Industrial Materials}.
\newblock Reinhold Book Corp. New York, 3 edition, 1968; p 1003.

\bibitem{sellinger}
Ben Sellinger.
\newblock {\em Chemistry in the marketplace. A Consumer Guide}.
\newblock Harcourt Brace $\&$ Company, Australia, 1989.

\bibitem{Seymour2}
Raymond~B. Seymour and Charles~E. Carraher.
\newblock {\em GIANT MOLECULES; Essential Materials for Everyday Living and
  Problem Solving}.
\newblock Wiley-Interscience: New York, 1 edition, 1990.

\bibitem{Simpson}
C.F. Simpson, editor.
\newblock {\em Techniques in Liquid Chromatography}.
\newblock John Wiley, New York, 1982.

\bibitem{thomson}
Stephen Thompson.
\newblock {\em Chemtrek - small-scale experiments for general chemistry}.
\newblock Prentice-Hall, Inc, Englewood Cliffs, New Jersey 07632, 1 edition,
  1989.

\bibitem{vivian}
C.~Vivian.
\newblock {\em Science Experiments and Amusements for Children}.
\newblock Dover: New York, 1967.

\bibitem{trop}
Steven~S. Zumdahl.
\newblock {\em Chemical Principles}.
\newblock D. C. Heath and Company, 2 edition, March 1995.
\newblock 1343 pages \\ ISBN: 0-669-39321-5.

\end{thebibliography}
