X-Git-Url: https://pere.pagekite.me/gitweb/text-angrefrist.git/blobdiff_plain/81701a71ea30510f6d42a61cbfb30f59c82708e5..a4423575c20e0d7022b5b1500eafb45c8892d7f9:/rapport-forord.adoc?ds=inline

diff --git a/rapport-forord.adoc b/rapport-forord.adoc
index b6b28a9..2d8a3bb 100644
--- a/rapport-forord.adoc
+++ b/rapport-forord.adoc
@@ -141,5 +141,6 @@ kostnadsÂ­fritt ute pÃ¥ Internettarkivet her: https://archive.org/
 
 Oslo, 8. oktober 2023
 
-Ole-Erik Yrvin
+_Ole-Erik Yrvin_
+
 Tidl. utredningsleder
